ecaltime

Timing of ecalrec and xKalman for e20pile.4 ID Entries Mean RMS

100 70 .4613 .1076

1999/10/08 14.01 s

xkaltime

ID Entries Mean RMS

110 70 63.99 109.2

s

0 2 4 6 8 10 12 14 16

0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 1.1

0 2 4 6 8 10 12 14

0 100 200 300 400 500 600 700 800 900