xkaltime

Entries Mean RMS 1250 0.4721E-01 0.4661E-01

2000/03/20 17.31 s events / 0.01s

All events Events passing LVL2 Quantiles 50% 0.03s 80% 0.07s 95% 0.16s

xkaltime

Entries Mean RMS 1025 0.5176E-01 0.4920E-01

s events / 0.01s

Quantiles 50% 0.03s 80% 0.08s 95% 0.16s

10^{-1}

1

10

10^2

-0.05 0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4

10^{-1}

1

10

10^2

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4