ecaltime

Entries Mean RMS 1250 0.4206 0.2347E-01

2000/03/20 17.31 s events / 0.01s

All events Events passing LVL2 Quantiles 50% 0.43s 80% 0.44s 95% 0.45s

10^{-1}

1

10

10^2

0.34 0.36 0.38 0.4 0.42 0.44 0.46 0.48 0.5