xkaltime

Entries Mean RMS 1250 0.5826E-01 0.5322E-01

2000/03/09 12.36 s events / 0.01s

All events Events passing LVL2 Quantiles 50% 0.04s 80% 0.08s 95% 0.16s

xkaltime

Entries Mean RMS 1025 0.5218E-01 0.4094E-01

s events / 0.01s

Quantiles 50% 0.04s 80% 0.07s 95% 0.15s

1

10

10^2

-0.1 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

1

10

10^2

-0.05 0 0.05 0.1 0.15 0.2 0.25 0.3 0.35