ecaltime

Entries Mean RMS 1250 0.4423 0.2594E-01

2000/03/09 12.35 s events / 0.01s

All events Events passing LVL2 Quantiles 50% 0.44s 80% 0.46s 95% 0.49s

1

10

10^2

0.35 0.375 0.4 0.425 0.45 0.475 0.5 0.525 0.55